BIRK111

BI(D)-7

BI(D)-6

BI(D)-3

0 5 5 10 15

1 in=5 NM

MHA 3800

335°

-· ···

335°

195°

195° 1000´ RIGHT RK NDB 1500´

3.00°

195°

LOC

319 GF

GROF

355 RK

REYKJAVIK

379 SA

SKAGI

195°

ILS 195° 109.9 IRK

REYKJAVIK

ILS Rwy 20

109.9 IRK LOC Apt. Elev

11-1

Gnd speed-Kts

CHANGES:

MSA

MISSED APPROACH:

JEPPESEN

015°

141°

321°

64-10

64-20

22-20 22-10 22-00 21-50 21-40

Alt Set: hPa (IN on req) Rwy Elev: 1hPa

Trans level: By ATC Trans alt: 7000´ (6974´)

4200´

5600´

4700´

195° 015°

GF Lctr

REYKJAVIK, ICELAND

··· ·-

--· ··-·

·-· -·-

1500

119.0

REYKJAVIK Tower 118.0

121.7

Ground

CAT A, B & C

MM

RWY 20 26´

3500´

(3474´)

LOM--^{GF Lctr} MM

TCH Displ

OCA(H) RWY 20 ILS A: B: C: GS out

(1474´).

LOC Desc. Grad.

STRAIGHT-IN LANDING RWY

A B C D

FULL ALS out ALS out_{MDA(H)}

CIRCLE-TO-LAND ILS LOC (GS out)

5.2%

70 90 100 120 140 160

195°

20

DA(H) MDA(H) 390´ (364´)

510´

1200m

1600m 1600m 180 135 100 Kts Max

D

1500m 1600m RVR VIS

NOT APPLICABLE NOT APPLICABLE

0.2

·· ·-· -·-

540´ 640´ 2400m

1398´

1191´

1381´

2671´

1588´

922´

2110´

1575´

2797´ 2983´

968´

938´

REYKJAVIK Approach (R)

0.6

377 484 538 646 753 861

45´

(974´)

390´(364´)

thresh 52´

295°

5.6 3.8

GS 1560´ (1534´)

(1534´)

1560´

-·-·

(465´) (495´)

(595´)

NES 370 NS_{LOC DME}

·· ·-· ·

109.1 IRE

128.1

*ATIS

© JEPPESEN SANDERSON, INC., 1991, 1999. ALL RIGHTS RESERVED.

729´

200´ 210´ 220´

(174´) (184´) (194´)

230´ (204´)

TO RWY 02

PANS OPS

D10.6

D5.0

D1.0

D1.2

D1.0

D1.2

D5.0

D10.6 3800´

(3774´)

3800´

(3774´)

Climb on to , then turn to and hold at Contact Reykjavik TOWER.

ILS GS or MAP at GF Lctr/D1.2

West of rwy 02/20 East of rwy 02/20

MDA(H)

700´

700´

(655´)

(655´)

1600m

2800m

22 NOV 96

See other side.